-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.15492218116
cusum  =  0.0966136465582
eta  =  0.669606523281
hl_amp_ratio  =  0.704026734356
kurtosis  =  -0.783808094112
n_points  =  377
period  =  0.638021892756
period_SNR  =  52.2895523042
period_log10FAP  =  -51.4089367553
period_uncertainty  =  0.000139073295736
phase_cusum  =  0.277974731806
phase_eta  =  0.235838344759
phi21  =  1.34664081791
phi31  =  -0.384411168261
quartile31  =  0.22
r21  =  0.430551944487
r31  =  0.22840119338
shapiro_w  =  0.97362524271
skewness  =  -0.193081320867
slope_per10  =  -0.146712836591
slope_per90  =  0.219581943662
stetson_k  =  0.815387035035
weighted_mean  =  15.3693741307
weighted_std  =  0.126669132641
