-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.231347805865
cusum  =  0.178512838166
eta  =  0.550186684339
hl_amp_ratio  =  0.398250143462
kurtosis  =  -0.603627176728
n_points  =  293
period  =  0.638395401188
period_SNR  =  34.014629406
period_log10FAP  =  -35.9119790751
period_uncertainty  =  0.000110197372687
phase_cusum  =  0.222043119025
phase_eta  =  0.142905632296
phi21  =  -2.31704104733
phi31  =  -4.36755618142
quartile31  =  0.27
r21  =  0.499412186687
r31  =  0.260801579768
shapiro_w  =  0.904629170895
skewness  =  -0.74378486977
slope_per10  =  -0.178314263662
slope_per90  =  0.244937089879
stetson_k  =  0.740506582664
weighted_mean  =  16.5460695334
weighted_std  =  0.201721757972
