-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.94


######### Lightcurve features #########

amplitude  =  0.265829462324
cusum  =  0.163250927303
eta  =  0.686221911836
hl_amp_ratio  =  0.28940290571
kurtosis  =  -1.05579907201
n_points  =  277
period  =  0.682445548097
period_SNR  =  31.2443312786
period_log10FAP  =  -30.3927042933
period_uncertainty  =  0.000125866021833
phase_cusum  =  0.227892327372
phase_eta  =  0.568647444894
phi21  =  0.843649466895
phi31  =  2.21652779811
quartile31  =  0.42
r21  =  0.344661684819
r31  =  0.263220690204
shapiro_w  =  0.893891811371
skewness  =  -0.519098035436
slope_per10  =  -0.178029582747
slope_per90  =  0.263915129101
stetson_k  =  0.749013070055
weighted_mean  =  15.915422043
weighted_std  =  0.25869549475
