-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.346230331017
cusum  =  0.0908967700651
eta  =  0.651839941948
hl_amp_ratio  =  0.601391605449
kurtosis  =  -1.04271553605
n_points  =  325
period  =  0.621062626005
period_SNR  =  41.254774624
period_log10FAP  =  -43.4167722056
period_uncertainty  =  0.000104058481795
phase_cusum  =  0.294671433132
phase_eta  =  0.110586312357
phi21  =  -2.21963457713
phi31  =  -1.18107198679
quartile31  =  0.5
r21  =  0.479432236097
r31  =  0.31822661402
shapiro_w  =  0.925261437893
skewness  =  -0.466644267181
slope_per10  =  -0.161394722884
slope_per90  =  0.228531271129
stetson_k  =  0.83004494545
weighted_mean  =  15.5057614192
weighted_std  =  0.290043301224
