-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.30855998321
cusum  =  0.14672602661
eta  =  0.476478877269
hl_amp_ratio  =  0.392918666827
kurtosis  =  -0.897590697347
n_points  =  381
period  =  0.694432211151
period_SNR  =  44.3896611917
period_log10FAP  =  -51.0437792469
period_uncertainty  =  0.000137282982209
phase_cusum  =  0.261922000557
phase_eta  =  0.210749521925
phi21  =  1.06067002954
phi31  =  -0.823273990368
quartile31  =  0.41
r21  =  0.438188970366
r31  =  0.241926303802
shapiro_w  =  0.92845416069
skewness  =  -0.530183015182
slope_per10  =  -0.07980374981
slope_per90  =  0.292400002945
stetson_k  =  0.759982614277
weighted_mean  =  14.2566933634
weighted_std  =  0.259638744294
