-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.318520506482
cusum  =  0.149608440495
eta  =  0.571015813548
hl_amp_ratio  =  0.633240163192
kurtosis  =  -0.985944405446
n_points  =  299
period  =  0.625527143883
period_SNR  =  42.9898420691
period_log10FAP  =  -39.1366617718
period_uncertainty  =  0.000179645949304
phase_cusum  =  0.259990175171
phase_eta  =  0.143127931656
phi21  =  1.01431471719
phi31  =  2.23643872142
quartile31  =  0.41
r21  =  0.401300958169
r31  =  0.331867493004
shapiro_w  =  0.94564551115
skewness  =  -0.368440219146
slope_per10  =  -0.184371653522
slope_per90  =  0.287562372647
stetson_k  =  0.850722536994
weighted_mean  =  11.4438801792
weighted_std  =  0.255057258528
