-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.278916464934
cusum  =  0.161935074384
eta  =  0.481955933893
hl_amp_ratio  =  0.593180150161
kurtosis  =  -1.37816079609
n_points  =  225
period  =  0.630501500861
period_SNR  =  30.1469761714
period_log10FAP  =  -31.2392569116
period_uncertainty  =  0.000113130969703
phase_cusum  =  0.304086297921
phase_eta  =  0.157897443757
phi21  =  -1.90430660687
phi31  =  -0.918294416143
quartile31  =  0.49
r21  =  0.455333645821
r31  =  0.250211283513
shapiro_w  =  0.919623196125
skewness  =  -0.195868072603
slope_per10  =  -0.159774707071
slope_per90  =  0.240798785935
stetson_k  =  0.836942589919
weighted_mean  =  15.8381651116
weighted_std  =  0.257462249701
