-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.174684955015
cusum  =  0.0821929994947
eta  =  0.594018456778
hl_amp_ratio  =  0.881446487146
kurtosis  =  -1.26675631165
n_points  =  335
period  =  0.612442457369
period_SNR  =  43.6456027345
period_log10FAP  =  -47.1447145165
period_uncertainty  =  0.000101203396362
phase_cusum  =  0.270842247763
phase_eta  =  0.309586074699
phi21  =  1.18729665309
phi31  =  2.57357393266
quartile31  =  0.265
r21  =  0.367399372093
r31  =  0.180745940473
shapiro_w  =  0.947047472
skewness  =  -0.0765002500827
slope_per10  =  -0.219425824361
slope_per90  =  0.301141169311
stetson_k  =  0.882518792584
weighted_mean  =  15.7450972578
weighted_std  =  0.145843866035
