-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.75


######### Lightcurve features #########

amplitude  =  0.358101324325
cusum  =  0.286196064262
eta  =  0.519143062732
hl_amp_ratio  =  0.650925751152
kurtosis  =  -0.532275546878
n_points  =  44
period  =  0.786225775932
period_SNR  =  7.14200307832
period_log10FAP  =  -2.74551391698
period_uncertainty  =  0.000141956450585
phase_cusum  =  0.284462497794
phase_eta  =  0.585389008185
phi21  =  -2.16269045731
phi31  =  -1.4029866445
quartile31  =  0.185
r21  =  0.585585162927
r31  =  0.295734060716
shapiro_w  =  0.9475710392
skewness  =  -0.552281849718
slope_per10  =  -0.335971628863
slope_per90  =  0.742371286382
stetson_k  =  0.782009836854
weighted_mean  =  14.6738636364
weighted_std  =  0.163876559823
