-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.305581985937
cusum  =  0.125760694224
eta  =  0.932637896629
hl_amp_ratio  =  0.711290719928
kurtosis  =  -0.173830681809
n_points  =  344
period  =  0.600468770464
period_SNR  =  36.7073509583
period_log10FAP  =  -30.2047262974
period_uncertainty  =  0.000101143509436
phase_cusum  =  0.298003605391
phase_eta  =  1.0670733703
phi21  =  3.92768875883
phi31  =  4.84783900398
quartile31  =  0.4
r21  =  0.347742486077
r31  =  0.226332270463
shapiro_w  =  0.99138456583
skewness  =  -0.0544490401894
slope_per10  =  -0.0470129913928
slope_per90  =  0.0476444802568
stetson_k  =  0.776697070469
weighted_mean  =  17.1712886872
weighted_std  =  0.274835441341
