-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.285732065999
cusum  =  0.107734458462
eta  =  0.640638657969
hl_amp_ratio  =  0.81539079995
kurtosis  =  -0.877973166164
n_points  =  345
period  =  0.68244701072
period_SNR  =  45.6548067659
period_log10FAP  =  -47.0702720556
period_uncertainty  =  0.000130646878538
phase_cusum  =  0.241149208118
phase_eta  =  0.132747263184
phi21  =  -2.05117890706
phi31  =  -3.76643109563
quartile31  =  0.4
r21  =  0.449185505984
r31  =  0.272207928485
shapiro_w  =  0.969024896622
skewness  =  -0.178224893253
slope_per10  =  -0.175999989733
slope_per90  =  0.204999993245
stetson_k  =  0.822755085057
weighted_mean  =  15.6149074883
weighted_std  =  0.242486867337
