-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.291316380183
cusum  =  0.101859027771
eta  =  0.591922075071
hl_amp_ratio  =  0.580006342601
kurtosis  =  -1.0431835044
n_points  =  346
period  =  0.649286658411
period_SNR  =  45.5513443373
period_log10FAP  =  -49.5182302416
period_uncertainty  =  0.000118241309565
phase_cusum  =  0.302107821776
phase_eta  =  0.0819855459073
phi21  =  -2.12356572131
phi31  =  -0.853599111578
quartile31  =  0.44
r21  =  0.459356975095
r31  =  0.260805703417
shapiro_w  =  0.934535861015
skewness  =  -0.439321740763
slope_per10  =  -0.187168265527
slope_per90  =  0.194157253861
stetson_k  =  0.825990598534
weighted_mean  =  15.1596123624
weighted_std  =  0.252328673791
