-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.180441026444
cusum  =  0.223201269374
eta  =  0.537468015138
hl_amp_ratio  =  1.03509504881
kurtosis  =  -0.573962735827
n_points  =  437
period  =  0.598895172692
period_SNR  =  40.621961527
period_log10FAP  =  -39.2973942636
period_uncertainty  =  0.000100600549102
phase_cusum  =  0.190057575974
phase_eta  =  0.686861904987
phi21  =  1.35623705569
phi31  =  -0.308854001435
quartile31  =  0.29
r21  =  0.521610286742
r31  =  0.176904952472
shapiro_w  =  0.990557312965
skewness  =  0.0921826942084
slope_per10  =  -0.0656532395911
slope_per90  =  0.098936713481
stetson_k  =  0.80999034921
weighted_mean  =  15.996667782
weighted_std  =  0.187068476638
