-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.72


######### Lightcurve features #########

amplitude  =  0.159081221427
cusum  =  0.257325916273
eta  =  0.612410503828
hl_amp_ratio  =  0.193773573507
kurtosis  =  -0.860227352242
n_points  =  43
period  =  0.729704475911
period_SNR  =  7.48902788979
period_log10FAP  =  -2.18558681875
period_uncertainty  =  0.000183450393924
phase_cusum  =  0.299850114302
phase_eta  =  0.32028691319
phi21  =  3.40007703321
phi31  =  3.30353156334
quartile31  =  0.27
r21  =  0.668629548841
r31  =  0.677340798801
shapiro_w  =  0.788742363453
skewness  =  -0.881283541597
slope_per10  =  -0.548999989405
slope_per90  =  0.695600025356
stetson_k  =  0.676299166172
weighted_mean  =  14.8030232558
weighted_std  =  0.158723613573
