-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.281594324415
cusum  =  0.173038286814
eta  =  0.517822364181
hl_amp_ratio  =  0.609930967778
kurtosis  =  -0.979754628857
n_points  =  373
period  =  0.679343678722
period_SNR  =  44.1212425777
period_log10FAP  =  -48.5557895606
period_uncertainty  =  0.000125599708071
phase_cusum  =  0.25688563622
phase_eta  =  0.0324590128842
phi21  =  -2.11129946747
phi31  =  -0.898132779135
quartile31  =  0.38
r21  =  0.501034751091
r31  =  0.357102062422
shapiro_w  =  0.928469061852
skewness  =  -0.459280781017
slope_per10  =  -0.200925724002
slope_per90  =  0.255159676441
stetson_k  =  0.823092040159
weighted_mean  =  15.3987860276
weighted_std  =  0.25391606808
