-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.259569124206
cusum  =  0.120436123242
eta  =  0.566435192724
hl_amp_ratio  =  0.684104608256
kurtosis  =  -0.877539438068
n_points  =  371
period  =  0.704564384444
period_SNR  =  45.2874711101
period_log10FAP  =  -49.0818395322
period_uncertainty  =  0.000135098253052
phase_cusum  =  0.210942019335
phase_eta  =  0.119760921138
phi21  =  1.11523151305
phi31  =  2.50792643402
quartile31  =  0.31
r21  =  0.497675617567
r31  =  0.280788452628
shapiro_w  =  0.953702688217
skewness  =  -0.394692464641
slope_per10  =  -0.188211334945
slope_per90  =  0.297656265155
stetson_k  =  0.818981875934
weighted_mean  =  15.6826681916
weighted_std  =  0.213905526662
