-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  CEPH_Other
class_probability =  0.34


######### Lightcurve features #########

amplitude  =  0.221942904795
cusum  =  0.0877040027268
eta  =  0.603638765501
hl_amp_ratio  =  0.626502509397
kurtosis  =  -0.919731632811
n_points  =  372
period  =  0.384890252671
period_SNR  =  50.9457312331
period_log10FAP  =  -56.7156249292
period_uncertainty  =  4.03178430325e-05
phase_cusum  =  0.268359043069
phase_eta  =  0.37932179132
phi21  =  -1.3443515058
phi31  =  0.0524020319733
quartile31  =  0.27
r21  =  0.128654156303
r31  =  0.0913548821266
shapiro_w  =  0.95919573307
skewness  =  -0.304953323917
slope_per10  =  -0.0589605574466
slope_per90  =  0.078897382456
stetson_k  =  0.852911246619
weighted_mean  =  12.7935566547
weighted_std  =  0.170130566213
