-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.97


######### Lightcurve features #########

amplitude  =  0.25435568718
cusum  =  0.115282657899
eta  =  0.740931913464
hl_amp_ratio  =  1.09842808916
kurtosis  =  -1.00361236852
n_points  =  274
period  =  0.672486811738
period_SNR  =  39.8504744235
period_log10FAP  =  -35.654551079
period_uncertainty  =  0.000128151313968
phase_cusum  =  0.272521316389
phase_eta  =  0.0939209467771
phi21  =  1.20540190593
phi31  =  2.61619874537
quartile31  =  0.3575
r21  =  0.48127063668
r31  =  0.307626868961
shapiro_w  =  0.968403697014
skewness  =  0.0378489266557
slope_per10  =  -0.32847108369
slope_per90  =  0.391149872736
stetson_k  =  0.848592542401
weighted_mean  =  14.4105357627
weighted_std  =  0.215495706792
