-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.268466102249
cusum  =  0.192597224221
eta  =  0.455761977355
hl_amp_ratio  =  0.729601592951
kurtosis  =  -0.510639948635
n_points  =  263
period  =  0.638329127006
period_SNR  =  28.0342323653
period_log10FAP  =  -30.1842249088
period_uncertainty  =  0.000109430354697
phase_cusum  =  0.218182617792
phase_eta  =  0.368449147858
phi21  =  0.998008940157
phi31  =  2.62171796678
quartile31  =  0.43
r21  =  0.425186511739
r31  =  0.216804223518
shapiro_w  =  0.950965166092
skewness  =  -0.556854581846
slope_per10  =  -0.160568808092
slope_per90  =  0.162871614545
stetson_k  =  0.836760723528
weighted_mean  =  12.4649872935
weighted_std  =  0.260871559611
