-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.96


######### Lightcurve features #########

amplitude  =  0.266657515078
cusum  =  0.1666384445
eta  =  0.544330906019
hl_amp_ratio  =  0.218869496546
kurtosis  =  -0.0114686294096
n_points  =  351
period  =  0.676022009274
period_SNR  =  36.7788613077
period_log10FAP  =  -39.0531580377
period_uncertainty  =  0.000149265189276
phase_cusum  =  0.214540202751
phase_eta  =  0.40639385174
phi21  =  3.83895615649
phi31  =  4.75655276793
quartile31  =  0.315
r21  =  0.445020695169
r31  =  0.315332772473
shapiro_w  =  0.858298420906
skewness  =  -1.0441975902
slope_per10  =  -0.151488576133
slope_per90  =  0.276983274327
stetson_k  =  0.681768665713
weighted_mean  =  15.6978792731
weighted_std  =  0.244111302154
