-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.79


######### Lightcurve features #########

amplitude  =  0.282544086945
cusum  =  0.213549671795
eta  =  0.568144682354
hl_amp_ratio  =  0.743688482671
kurtosis  =  -0.786344160044
n_points  =  125
period  =  0.695027871929
period_SNR  =  18.4549480297
period_log10FAP  =  -12.6412032287
period_uncertainty  =  0.000159850024661
phase_cusum  =  0.334439609368
phase_eta  =  0.168218106885
phi21  =  -2.04552918357
phi31  =  -3.69608996945
quartile31  =  0.36
r21  =  0.532733378682
r31  =  0.318326585968
shapiro_w  =  0.959629178047
skewness  =  -0.369060857553
slope_per10  =  -0.282727776184
slope_per90  =  0.783085841283
stetson_k  =  0.798089337117
weighted_mean  =  13.3426737903
weighted_std  =  0.24586296188
