-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.97


######### Lightcurve features #########

amplitude  =  0.327166886904
cusum  =  0.14095345604
eta  =  0.524547518899
hl_amp_ratio  =  0.308024080084
kurtosis  =  0.30274510443
n_points  =  217
period  =  0.566962808681
period_SNR  =  26.378912151
period_log10FAP  =  -26.3918217176
period_uncertainty  =  0.000120659729037
phase_cusum  =  0.272427895685
phase_eta  =  0.0491223705555
phi21  =  0.675332376644
phi31  =  1.67347397842
quartile31  =  0.31
r21  =  0.484167306402
r31  =  0.356626272687
shapiro_w  =  0.857873141766
skewness  =  -1.12573109727
slope_per10  =  -0.182432703076
slope_per90  =  0.311586144847
stetson_k  =  0.700426872905
weighted_mean  =  15.6596186831
weighted_std  =  0.250479821117
