-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_e
class_probability =  0.34


######### Lightcurve features #########

amplitude  =  0.0846447054247
cusum  =  0.10106691199
eta  =  0.564349629807
hl_amp_ratio  =  1.7813536686
kurtosis  =  -1.08305433677
n_points  =  216
period  =  0.273946809623
period_SNR  =  15.0748162669
period_log10FAP  =  -12.9330845489
period_uncertainty  =  1.6094163885e-05
phase_cusum  =  0.191801082654
phase_eta  =  1.3572630659
phi21  =  -0.818581088382
phi31  =  -1.20568928473
quartile31  =  0.17
r21  =  0.16872719128
r31  =  0.228870128111
shapiro_w  =  0.940983355045
skewness  =  0.365709463718
slope_per10  =  -0.0740345921231
slope_per90  =  0.118167862132
stetson_k  =  0.828337272811
weighted_mean  =  15.4821576693
weighted_std  =  0.0974009459545
