-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.4


######### Lightcurve features #########

amplitude  =  0.447897291493
cusum  =  0.377762053119
eta  =  0.692652680507
hl_amp_ratio  =  0.455390651491
kurtosis  =  -1.11436891708
n_points  =  33
period  =  0.205463132643
period_SNR  =  6.87264490575
period_log10FAP  =  -0.981649988386
period_uncertainty  =  1.07381171321e-05
phase_cusum  =  0.474558688247
phase_eta  =  0.333214043012
phi21  =  0.261328785042
phi31  =  1.41690884237
quartile31  =  0.54
r21  =  0.237589110754
r31  =  0.175916645704
shapiro_w  =  0.901042521
skewness  =  -0.49290269421
slope_per10  =  -0.0623612399332
slope_per90  =  0.297666667029
stetson_k  =  0.781572335756
weighted_mean  =  14.8158220648
weighted_std  =  0.35169751274
