-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  CEPH_1O
class_probability =  0.46


######### Lightcurve features #########

amplitude  =  0.0566081522321
cusum  =  0.487338723277
eta  =  0.475859555977
hl_amp_ratio  =  0.637988801518
kurtosis  =  -1.05945990263
n_points  =  46
period  =  1.65008741868
period_SNR  =  8.27057306535
period_log10FAP  =  -2.31862177528
period_uncertainty  =  0.000692586656611
phase_cusum  =  0.380909211322
phase_eta  =  0.508012228679
phi21  =  -1.27569331491
phi31  =  -1.62314484868
quartile31  =  0.0775
r21  =  0.128624058325
r31  =  0.374355342122
shapiro_w  =  0.940786004066
skewness  =  0.0129228274693
slope_per10  =  -1.77312579323
slope_per90  =  1.20814016607
stetson_k  =  0.804174561456
weighted_mean  =  14.1618928571
weighted_std  =  0.045535051349
