-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.263605223331
cusum  =  0.149979090468
eta  =  0.465118585187
hl_amp_ratio  =  0.336816265816
kurtosis  =  0.153650150172
n_points  =  157
period  =  0.528106593373
period_SNR  =  20.4392331859
period_log10FAP  =  -15.0339044746
period_uncertainty  =  0.000160870791558
phase_cusum  =  0.228805971528
phase_eta  =  0.43650793798
phi21  =  -2.3524787474
phi31  =  -1.82057748004
quartile31  =  0.33
r21  =  0.419232913671
r31  =  0.227257822875
shapiro_w  =  0.897846341133
skewness  =  -0.95584621577
slope_per10  =  -0.186143861223
slope_per90  =  0.414936334587
stetson_k  =  0.732013588344
weighted_mean  =  14.5391193867
weighted_std  =  0.223575208727
