-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.25171830523
cusum  =  0.2341125443
eta  =  0.719237446098
hl_amp_ratio  =  0.516140473988
kurtosis  =  -0.797859582539
n_points  =  145
period  =  0.654796348028
period_SNR  =  23.2451088057
period_log10FAP  =  -17.6266098928
period_uncertainty  =  0.000253286565953
phase_cusum  =  0.238461098884
phase_eta  =  0.192441786487
phi21  =  -2.39366043356
phi31  =  -3.27891676348
quartile31  =  0.33
r21  =  0.360196025718
r31  =  0.142350772515
shapiro_w  =  0.939304828644
skewness  =  -0.534329130744
slope_per10  =  -0.22983563869
slope_per90  =  0.362266727722
stetson_k  =  0.779043204846
weighted_mean  =  14.9613257887
weighted_std  =  0.199569691173
