-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.314623553671
cusum  =  0.179066927777
eta  =  0.588735367853
hl_amp_ratio  =  0.647531059619
kurtosis  =  -0.855567926572
n_points  =  174
period  =  0.663072642348
period_SNR  =  27.7122415688
period_log10FAP  =  -22.021355252
period_uncertainty  =  0.000127025414887
phase_cusum  =  0.251232220368
phase_eta  =  0.0949087373319
phi21  =  -2.08180123478
phi31  =  -4.10451749017
quartile31  =  0.4375
r21  =  0.48433323305
r31  =  0.293670096045
shapiro_w  =  0.952991425991
skewness  =  -0.399020025596
slope_per10  =  -0.19862314138
slope_per90  =  0.440847938785
stetson_k  =  0.798790272539
weighted_mean  =  14.0352559937
weighted_std  =  0.269338205946
