-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.84


######### Lightcurve features #########

amplitude  =  0.261019326491
cusum  =  0.285396037291
eta  =  0.544086457236
hl_amp_ratio  =  0.585976409559
kurtosis  =  -1.18553186475
n_points  =  61
period  =  0.626007165607
period_SNR  =  8.73299894345
period_log10FAP  =  -4.76183844934
period_uncertainty  =  0.000156434755915
phase_cusum  =  0.264751681403
phase_eta  =  0.302816382523
phi21  =  1.85446044353
phi31  =  4.27432121567
quartile31  =  0.34
r21  =  0.332150938223
r31  =  0.151902477297
shapiro_w  =  0.937209784985
skewness  =  -0.257559225035
slope_per10  =  -0.516499998048
slope_per90  =  0.530999992043
stetson_k  =  0.838492708368
weighted_mean  =  14.7113039355
weighted_std  =  0.19747158798
