-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  CEPH_1O
class_probability =  0.5


######### Lightcurve features #########

amplitude  =  0.0388660154393
cusum  =  0.201516310275
eta  =  1.47089684433
hl_amp_ratio  =  0.696352548778
kurtosis  =  -0.869161588015
n_points  =  40
period  =  1.05838864878
period_SNR  =  6.73015649818
period_log10FAP  =  -0.0612707551634
period_uncertainty  =  0.000336103129727
phase_cusum  =  0.248131833499
phase_eta  =  1.1039246255
phi21  =  -3.21995367407
phi31  =  -4.60853211809
quartile31  =  0.05
r21  =  0.134801199034
r31  =  0.119054907097
shapiro_w  =  0.947739601135
skewness  =  -0.402832281155
slope_per10  =  -0.67759999074
slope_per90  =  5.57932151183
stetson_k  =  0.825463752566
weighted_mean  =  15.4150180505
weighted_std  =  0.0291965151565
