-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.45


######### Lightcurve features #########

amplitude  =  0.171187683333
cusum  =  0.227550820731
eta  =  0.547118881094
hl_amp_ratio  =  0.577219378956
kurtosis  =  -1.14161115718
n_points  =  168
period  =  0.179081986702
period_SNR  =  20.3103962112
period_log10FAP  =  -17.7595097489
period_uncertainty  =  8.55427265099e-06
phase_cusum  =  0.262217843123
phase_eta  =  0.228852057823
phi21  =  2.91198886882
phi31  =  2.01428616828
quartile31  =  0.21
r21  =  0.160932890296
r31  =  0.0518822016144
shapiro_w  =  0.94245326519
skewness  =  -0.312410635978
slope_per10  =  -0.101372350778
slope_per90  =  0.0703186814698
stetson_k  =  0.844051407871
weighted_mean  =  16.5491377971
weighted_std  =  0.12217776543
