-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  LPV_SRV_AGB_O
class_probability =  0.22


######### Lightcurve features #########

amplitude  =  0.363857377069
cusum  =  0.243478891898
eta  =  3.11236064861
hl_amp_ratio  =  4.38163427536
kurtosis  =  -1.65168671685
n_points  =  292
period  =  4686.39651
period_SNR  =  12.8633415463
period_log10FAP  =  -2.825479477e-14
period_uncertainty  =  3905.330425
phase_cusum  =  0.19725087484
phase_eta  =  2.71170643318
phi21  =  -3.93207311315
phi31  =  -4.79889887497
quartile31  =  1.09
r21  =  1.02683638432
r31  =  0.503854730092
shapiro_w  =  0.827945709229
skewness  =  0.257746904178
slope_per10  =  -0.151200001128
slope_per90  =  0.330199999735
stetson_k  =  0.770716562805
weighted_mean  =  16.0374105937
weighted_std  =  0.599587190938
