-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_e
class_probability =  0.57


######### Lightcurve features #########

amplitude  =  0.0464108737716
cusum  =  0.17196473634
eta  =  1.84469862101
hl_amp_ratio  =  1.0762913056
kurtosis  =  0.0978381029433
n_points  =  167
period  =  0.249495382117
period_SNR  =  12.7690539884
period_log10FAP  =  -0.68384628962
period_uncertainty  =  1.99250938532e-05
phase_cusum  =  0.183362440761
phase_eta  =  1.68076769941
phi21  =  2.16361440153
phi31  =  5.71717254911
quartile31  =  0.08
r21  =  0.372026950352
r31  =  0.301303224897
shapiro_w  =  0.994585156441
skewness  =  -0.0128886247602
slope_per10  =  -0.0770630014526
slope_per90  =  0.0623554689487
stetson_k  =  0.793860598117
weighted_mean  =  17.3371691981
weighted_std  =  0.0665716267705
