-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.79


######### Lightcurve features #########

amplitude  =  0.0320015082069
cusum  =  0.100028924858
eta  =  1.90130110857
hl_amp_ratio  =  1.03578075227
kurtosis  =  -0.428928343463
n_points  =  169
period  =  0.0727972615571
period_SNR  =  9.9976842566
period_log10FAP  =  -0.00035383050608
period_uncertainty  =  1.13081368172e-06
phase_cusum  =  0.155527078671
phase_eta  =  1.77645968707
phi21  =  -2.00237400097
phi31  =  -1.68046916945
quartile31  =  0.09
r21  =  0.148742408591
r31  =  0.121802948143
shapiro_w  =  0.988185465336
skewness  =  -0.117176351538
slope_per10  =  -0.02545410115
slope_per90  =  0.0227396047322
stetson_k  =  0.835987313474
weighted_mean  =  16.9899388454
weighted_std  =  0.0622985887977
