-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.262964834614
cusum  =  0.12302167434
eta  =  0.509429225922
hl_amp_ratio  =  0.540216403286
kurtosis  =  -0.939364440016
n_points  =  395
period  =  0.691824334322
period_SNR  =  50.6220067897
period_log10FAP  =  -54.0551499095
period_uncertainty  =  0.000134984851246
phase_cusum  =  0.292149698678
phase_eta  =  0.184181046569
phi21  =  4.53371353076
phi31  =  5.65640148878
quartile31  =  0.405
r21  =  0.493204169168
r31  =  0.379600118889
shapiro_w  =  0.952259123325
skewness  =  -0.321069988088
slope_per10  =  -0.112621630887
slope_per90  =  0.181485152813
stetson_k  =  0.793576184642
weighted_mean  =  15.3734464272
weighted_std  =  0.252439387132
