<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.330442669207
cusum  =  0.16196627552
eta  =  0.460248608542
hl_amp_ratio  =  0.464643949352
kurtosis  =  -0.839179992961
n_points  =  410
period  =  0.59572892042
period_SNR  =  43.5323711242
period_log10FAP  =  -49.7127005455
period_uncertainty  =  9.96735605058e-05
phase_cusum  =  0.24393675534
phase_eta  =  0.0505669597297
phi21  =  1.03821836987
phi31  =  2.17527489575
quartile31  =  0.47
r21  =  0.609276933311
r31  =  0.327767217985
shapiro_w  =  0.925200819969
skewness  =  -0.576942069671
slope_per10  =  -0.136504680168
slope_per90  =  0.148094039126
stetson_k  =  0.743227462241
weighted_mean  =  15.2922716168
weighted_std  =  0.30289758921
</pre></body></html>