-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.269600021483
cusum  =  0.154700623914
eta  =  0.634637008171
hl_amp_ratio  =  0.695967172113
kurtosis  =  -0.753181546053
n_points  =  402
period  =  0.730125015974
period_SNR  =  53.0812922577
period_log10FAP  =  -55.7580208471
period_uncertainty  =  0.00017943599412
phase_cusum  =  0.299891067551
phase_eta  =  0.184248962583
phi21  =  -2.05191303338
phi31  =  -4.00042418085
quartile31  =  0.34
r21  =  0.464756035868
r31  =  0.274617168448
shapiro_w  =  0.962424457073
skewness  =  -0.430543506104
slope_per10  =  -0.141420439155
slope_per90  =  0.124950794739
stetson_k  =  0.800900014217
weighted_mean  =  15.3893847174
weighted_std  =  0.221609743863
