-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.36


######### Lightcurve features #########

amplitude  =  0.407938217838
cusum  =  0.39222234417
eta  =  0.34011945633
hl_amp_ratio  =  1.0293183274
kurtosis  =  -0.764874203451
n_points  =  360
period  =  0.997195177321
period_SNR  =  18.326588688
period_log10FAP  =  -15.047173286
period_uncertainty  =  0.00027718346989
phase_cusum  =  0.162966950423
phase_eta  =  1.33228275017
phi21  =  -2.50458702894
phi31  =  -4.83090502763
quartile31  =  0.41
r21  =  0.460540886439
r31  =  0.424513933362
shapiro_w  =  0.977985560894
skewness  =  0.0120042053155
slope_per10  =  -0.0762249851711
slope_per90  =  0.062198920683
stetson_k  =  0.824338667034
weighted_mean  =  15.0155354444
weighted_std  =  0.258905379024
