-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.91


######### Lightcurve features #########

amplitude  =  0.336202076271
cusum  =  0.385786937638
eta  =  0.204335429243
hl_amp_ratio  =  0.939188949708
kurtosis  =  -0.993661556878
n_points  =  393
period  =  0.668686731027
period_SNR  =  26.3675180509
period_log10FAP  =  -25.0483197856
period_uncertainty  =  0.000124634077635
phase_cusum  =  0.18740994532
phase_eta  =  0.932836538349
phi21  =  -1.88888502956
phi31  =  -2.04971700654
quartile31  =  0.57
r21  =  0.551834456225
r31  =  0.0601314526799
shapiro_w  =  0.967946887016
skewness  =  -0.116573686415
slope_per10  =  -0.068127755435
slope_per90  =  0.128388273966
stetson_k  =  0.819768793811
weighted_mean  =  14.5916252499
weighted_std  =  0.371691324465
