<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.53


######### Lightcurve features #########

amplitude  =  0.265258189726
cusum  =  0.13673962463
eta  =  0.634785283241
hl_amp_ratio  =  0.361050486288
kurtosis  =  -1.08907496604
n_points  =  114
period  =  0.538154151439
period_SNR  =  16.4404730846
period_log10FAP  =  -15.4068876907
period_uncertainty  =  9.42531673677e-05
phase_cusum  =  0.360099810736
phase_eta  =  0.169863548926
phi21  =  1.0699105576
phi31  =  2.44045808797
quartile31  =  0.37
r21  =  0.35467033138
r31  =  0.230309907555
shapiro_w  =  0.883225083351
skewness  =  -0.381375172304
slope_per10  =  -0.203294481311
slope_per90  =  0.65655016126
stetson_k  =  0.800439700395
weighted_mean  =  13.4858468336
weighted_std  =  0.212346065082
</pre></body></html>