-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.335766058732
cusum  =  0.156878020664
eta  =  0.510409469387
hl_amp_ratio  =  0.525810096593
kurtosis  =  -0.435017899584
n_points  =  364
period  =  0.644726375797
period_SNR  =  39.6910601736
period_log10FAP  =  -41.4819499965
period_uncertainty  =  0.000156389385637
phase_cusum  =  0.265524503065
phase_eta  =  0.241260699178
phi21  =  0.863774713987
phi31  =  1.95237975671
quartile31  =  0.3925
r21  =  0.537806267548
r31  =  0.315331817264
shapiro_w  =  0.942109704018
skewness  =  -0.609866699642
slope_per10  =  -0.130299907314
slope_per90  =  0.214351540629
stetson_k  =  0.785713723198
weighted_mean  =  12.9676310948
weighted_std  =  0.294600207896
