-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.159955324974
cusum  =  0.269206825098
eta  =  0.322010923235
hl_amp_ratio  =  0.700467012042
kurtosis  =  -0.02700247207
n_points  =  267
period  =  0.623964310199
period_SNR  =  15.4086607568
period_log10FAP  =  -11.9484358943
period_uncertainty  =  0.000153415891466
phase_cusum  =  0.278109458039
phase_eta  =  0.82097648087
phi21  =  -1.94605737533
phi31  =  -2.11158872144
quartile31  =  0.275
r21  =  0.513419275292
r31  =  0.207363824832
shapiro_w  =  0.954486370087
skewness  =  -0.685085071056
slope_per10  =  -0.171350000892
slope_per90  =  0.177750326917
stetson_k  =  0.787881974324
weighted_mean  =  11.9482665832
weighted_std  =  0.210843853207
