-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.256121313949
cusum  =  0.15913812244
eta  =  0.569593408228
hl_amp_ratio  =  0.562357579731
kurtosis  =  -0.858735911509
n_points  =  266
period  =  0.657203012726
period_SNR  =  32.3886396858
period_log10FAP  =  -31.9022787427
period_uncertainty  =  0.000121569188737
phase_cusum  =  0.282129766432
phase_eta  =  0.143971403034
phi21  =  4.16328021269
phi31  =  5.33912361806
quartile31  =  0.3275
r21  =  0.47491992238
r31  =  0.286422605449
shapiro_w  =  0.947303712368
skewness  =  -0.465060821864
slope_per10  =  -0.163983426222
slope_per90  =  0.310049992986
stetson_k  =  0.803847806584
weighted_mean  =  15.4494122133
weighted_std  =  0.204452327068
