-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.97


######### Lightcurve features #########

amplitude  =  0.248265021275
cusum  =  0.131999024018
eta  =  0.598839833903
hl_amp_ratio  =  0.588881715937
kurtosis  =  -1.06884082735
n_points  =  232
period  =  0.655650717449
period_SNR  =  30.1643869177
period_log10FAP  =  -30.0625904457
period_uncertainty  =  0.000120995559696
phase_cusum  =  0.224115211248
phase_eta  =  0.545456118109
phi21  =  4.06082027419
phi31  =  5.00919469146
quartile31  =  0.38
r21  =  0.323295976877
r31  =  0.170735631898
shapiro_w  =  0.924513399601
skewness  =  -0.454820204347
slope_per10  =  -0.185218691322
slope_per90  =  0.211407523888
stetson_k  =  0.815341347662
weighted_mean  =  16.4571221104
weighted_std  =  0.224605150425
