<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  CEPH_F
class_probability =  0.53


######### Lightcurve features #########

amplitude  =  0.23400965078
cusum  =  0.0866622713237
eta  =  0.693735998036
hl_amp_ratio  =  0.577312956138
kurtosis  =  -0.0230268683794
n_points  =  272
period  =  16.3888485609
period_SNR  =  27.5408357718
period_log10FAP  =  -27.7424653589
period_uncertainty  =  0.105641452833
phase_cusum  =  0.253490475402
phase_eta  =  0.257057830483
phi21  =  -1.03656398811
phi31  =  -0.0664854610554
quartile31  =  0.33
r21  =  0.481404049173
r31  =  0.183698918025
shapiro_w  =  0.958747029305
skewness  =  -0.663501247372
slope_per10  =  -1.23975904722
slope_per90  =  1.61012447296
stetson_k  =  0.774314497388
weighted_mean  =  14.5695829219
weighted_std  =  0.230761565766
</pre></body></html>