-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.9


######### Lightcurve features #########

amplitude  =  0.292325605392
cusum  =  0.142528554338
eta  =  0.483920049627
hl_amp_ratio  =  0.282288504939
kurtosis  =  -1.23750263882
n_points  =  232
period  =  0.609995599506
period_SNR  =  32.888700788
period_log10FAP  =  -34.6159966831
period_uncertainty  =  0.000104731065306
phase_cusum  =  0.274781918199
phase_eta  =  0.141818255317
phi21  =  -2.37899554474
phi31  =  -4.61482169762
quartile31  =  0.47
r21  =  0.423827986874
r31  =  0.171005309938
shapiro_w  =  0.872730970383
skewness  =  -0.532588947056
slope_per10  =  -0.200657103738
slope_per90  =  0.400600000285
stetson_k  =  0.754631190951
weighted_mean  =  15.3765330154
weighted_std  =  0.258175177177
