-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  CEPH_1O
class_probability =  0.41


######### Lightcurve features #########

amplitude  =  0.13941213268
cusum  =  0.11638986111
eta  =  0.518837096435
hl_amp_ratio  =  0.811071834802
kurtosis  =  -1.27481311266
n_points  =  385
period  =  0.545598043555
period_SNR  =  27.5514183888
period_log10FAP  =  -29.2808694455
period_uncertainty  =  0.000223474940702
phase_cusum  =  0.199676870797
phase_eta  =  1.02294286014
phi21  =  -1.35762930375
phi31  =  -3.48014638424
quartile31  =  0.3
r21  =  0.1671458127
r31  =  0.104674966377
shapiro_w  =  0.927943348885
skewness  =  -0.120880965942
slope_per10  =  -0.101933201482
slope_per90  =  0.133910888628
stetson_k  =  0.870939038788
weighted_mean  =  13.9516304348
weighted_std  =  0.153449501103
