-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.335469218064
cusum  =  0.153308522166
eta  =  0.620091089729
hl_amp_ratio  =  0.587024932465
kurtosis  =  -0.583298762205
n_points  =  303
period  =  0.532240822286
period_SNR  =  45.7139007163
period_log10FAP  =  -39.0807462647
period_uncertainty  =  0.000130076581435
phase_cusum  =  0.223933224459
phase_eta  =  0.415001534887
phi21  =  4.05776495443
phi31  =  5.24544458587
quartile31  =  0.445
r21  =  0.365057441669
r31  =  0.214091662781
shapiro_w  =  0.930564761162
skewness  =  -0.611614385813
slope_per10  =  -0.0853275572323
slope_per90  =  0.123909714184
stetson_k  =  0.816809280486
weighted_mean  =  14.1705259884
weighted_std  =  0.276446668482
