-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.97


######### Lightcurve features #########

amplitude  =  0.1829625654
cusum  =  0.107851294064
eta  =  0.634287360235
hl_amp_ratio  =  0.773962420344
kurtosis  =  -1.1956531594
n_points  =  296
period  =  0.761629595494
period_SNR  =  38.3055744118
period_log10FAP  =  -41.4745433125
period_uncertainty  =  0.000162505254924
phase_cusum  =  0.244291223743
phase_eta  =  0.294501844466
phi21  =  1.33039399344
phi31  =  2.85367098391
quartile31  =  0.2725
r21  =  0.438385480378
r31  =  0.200870907778
shapiro_w  =  0.949935436249
skewness  =  -0.15839666132
slope_per10  =  -0.302813311624
slope_per90  =  0.283747260881
stetson_k  =  0.850564500712
weighted_mean  =  15.4326281731
weighted_std  =  0.163772727315
