-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.217093097934
cusum  =  0.228815992711
eta  =  0.653871582154
hl_amp_ratio  =  0.940526422527
kurtosis  =  -0.37114645838
n_points  =  300
period  =  0.663996399077
period_SNR  =  29.9836956957
period_log10FAP  =  -26.7176521511
period_uncertainty  =  0.000148202462352
phase_cusum  =  0.205942321275
phase_eta  =  0.841284238506
phi21  =  -1.89804572251
phi31  =  -0.671805563802
quartile31  =  0.31
r21  =  0.37036968615
r31  =  0.246426472383
shapiro_w  =  0.992056846619
skewness  =  -0.159037688397
slope_per10  =  -0.0960769011103
slope_per90  =  0.160141457711
stetson_k  =  0.804860184647
weighted_mean  =  15.4624123458
weighted_std  =  0.218544790352
